3.004.005.006.007.008.009.00-2.0-1.00.01.02.0log[Te(K)]

Mean Ion log[ g2 ]

CIEPIE56789101112135

12.013.014.015.016.017.018.02.04.06.08.0log[n(Hz)]

< gff(g2,u) >

PIE 7

PIE 10

PIE 13

CIE 6

CIE 7

CIE 8

6