clean_lm0123l Etoile: 26736 ; Zoom2 X=1306.33 Y=836.176

2 2.5 3 3.5 4 4.5

1600 1700 1800 1900 2000 2100 2200 Red band nbmesure= 148

2 2.5 3 3.5 4 4.5

1600 1700 1800 1900 2000 2100 2200 Blue band nbmesure= 149